ross_heatloss_batch ross_heatloss3 01-May-2007

1992 1993 1994 1995 1996 1997 1998 1999 2000 2001 2002 2003 2004 2005 2006 0

0.5

1

1.5

2

2.5

J x 10 20

Cumulative heat loss (SSMI)

Ross Drygalski McMurdo